<ul>
    <li>
        <p>Particulars</p>
        <p>Unit</p>
    </li>
    <li>
        <p>Cylinder Diameter</p>
        <p>300 mm</p>
    </li>
    <li>
        <p>Cylinder Height</p>
        <p>386±8 mm</p>
    </li>
    <li>
        <p>Total Area Dimension with Required Safety Distance (Length x Width)</p>
        <p>1.2</p>
    </li>
    <li>
        <p>Weight of Cylinder without LPG (Empty Cylinder Weight)</p>
        <p>8.5 KG to 9.5 KG</p>
    </li>
    <li>
        <p>Weight of Cylinder with LPG</p>
        <p>13.5 KG to 14.5 KG</p>
    </li>
</ul>